/////////////////////////////////////////////////////////
// This file is generated by Configurable Library Manager
// Do Not Modify Manually                                
/////////////////////////////////////////////////////////
#define    CLOCK_FREQ    .20000000
#define    XLCD_4BIT 
#define    XLCD_2LINE 
#define    XLCD_FONT5x8    
#define    XLCD_UPPER
#define    XLCD_DATA_PORT    2
#define    XLCD_RS_PIN    0x15                             
#define    XLCD_EN_PIN    0x16                             
#define    XLCD_RW_PIN    0x17                             
#define    XLCD_BLOCK         
#define    XLCD_DELAYMODE         
#define    XLCD_DISPLAYON
#define    XLCD_CURSORON
#define    XLCD_BLINKON
#define    XLCD_CURSOR_INCREMENT
#define    XLCD_DISPLAY_NOSHIFT
//                                                       
/////////////////////////////////////////////////////////
