./comngr -f -d --can-device /dev/can0 --bitrate 500 --node-id 127 /etc/canopen/d 2,387,858,067,612 bytes x ms

ms 0.0 20000.0 40000.0 60000.0 bytes

0M

20M

40M

60M

80M

100M

heap-admin x805C114:dictionary_set x805ADD5:dictionary_set